0 50 100 150 200 250 0 50 100 150 200 250

% increase in control

% increase in CNQX-treated

0 50 100 150 200 250 0 50 100 150 200

% increase in control

0 50 100 150 200 250 0 50 100 150 200 250

% increase in control

0 50 100 150 0

50

100

150

% increase in control

0 50 100 150 0

50

100

150

% increase in control

0 50 100 150 0

50

100

150

% increase in control

0 100 200 300 400 0

100

200

300

400

% increase in control

0 100 200 300 400 0

100

200

300

400

% increase in control

0 100 200 300 400 0

100

200

300

400

% increase in control