0 500 1000

1500

2000

Array-wide Spike Detection Rate (spikes/second)

0

0.5

1

Burstiness Index

-20 -16 -12 -8 -4 0 4 8 12 16 20 24 28 32 36 40 44 48 0

5

10

Time (hours)

Median ASDR