-12.5 -12.25 -12 -11.75 -11.5 0 400 800 1200

1600

11.5 11.75 12 12.25 12.5

23.5 23.75 24 24.25 24.5

Array-wide Spike Detection Rate (spikes/second)

47.5 47.75 48 48.25 48.5 Time (hours)