0 500 1000 1500 2000 2500 3000 3500 0 2 4 no drug

0 500 1000 1500 2000 2500 3000 3500 0 0.5 1 0.1uM CNQX

0 500 1000 1500 2000 2500 3000 3500 0 1 2 1uM CNQX

0 500 1000 1500 2000 2500 3000 3500 0 5 10 10uM CNQX

unit

0 500 1000 1500 2000 2500 3000 3500 0 2 4 100uM CNQX

0 500 1000 1500 2000 2500 3000 3500 0 0.5 1 0.5uM TTX

0 500 1000 1500 2000 2500 3000 3500 0 1 2 wash