1 2 3 4 5 6 7 8 9 10 11 0

10

20

30

40

50

60

70

80

90

100

Cell mEPSC Amplitude (pA)

treatment window: 10-12DIV

n = 30 mu = 24.81pA n = 81 mu = 21.51pA n = 1 mu = 16.78pA n = 16 mu = 21.37pA n = 5 mu = 67.25pA n = 3 mu = 468.41pA n = 41 mu = 45.92pA n = 6 mu = 23.61pA n = 43 mu = 21.28pA n = 33 mu = 14.68pA n = 57 mu = 28.47pA

Control CNQX-treated