1 2 3 4 5 6 7 8 9 10 11 0

10

20

30

40

50

60

Cell mEPSC Amplitude (pA)

treatment window: 13-15DIV

n = 66 mu = 28.12pA n = 80 mu = 44.08pA n = 30 mu = 35.66pA n = 12 mu = 16.27pA n = 51 mu = 19.04pA n = 7 mu = 16.89pA n = 46 mu = 16.55pA n = 7 mu = 29.36pA n = 14 mu = 21.27pA n = 67 mu = 21.93pA n = 5 mu = 16.82pA

Control CNQX-treated