0 5 10 15 20 25 30 35 0 10 20 30 40 50 60 70 80 90 100

Percentage of Events

Amplitude (pA) cinderella360 (CNQX-treated) and cinderella363 (control)

n_{cinderella360} = 7 n_{cinderella363} = 3