50 100 150

buster359 (100.13 +/- 0pA, n=1) buster359 (16.28 +/- 2.25pA, n=2) buster359 (24.91 +/- 0pA, n=1) cinderella18 (17.13 +/- 4.17pA, n=8) cinderella18 (33.63 +/- 0pA, n=1) cinderella19307 (17.23 +/- 5.87pA, n=22) cinderella19309 (28.77 +/- 9.19pA, n=12) cinderella360 (19.58 +/- 6.43pA, n=57) cinderella363 (34.84 +/- 0pA, n=1) cinderella17 (48.13 +/- 13.21pA, n=110) cinderella17 (29.5 +/- 4.09pA, n=5) donkeylips360 (56.93 +/- 25.59pA, n=5) donkeylips360 (75.61 +/- 27.28pA, n=858) donkeylips363 (125.02 +/- 11.2pA, n=2) donkeylips363 (119.69 +/- 34.68pA, n=115) euclid1 (51.24 +/- 33.78pA, n=32) euclid1 (38.99 +/- 17.81pA, n=11) euclid1 (17.06 +/- 0pA, n=1) euclid4 (53.78 +/- 27.83pA, n=40) euclid4 (83.15 +/- 78.93pA, n=4) euclid4 (43.77 +/- 11.42pA, n=4) nacho361 (33.07 +/- 7.25pA, n=4) nacho361 (14.17 +/- 3.16pA, n=2) nacho361 (15.31 +/- 0.91pA, n=6) nacho364 (41.18 +/- 22.24pA, n=3) nacho364 (33.35 +/- 7.11pA, n=3) nacho364 (33.32 +/- 11pA, n=4) nacho364 (32.05 +/- 10.72pA, n=2) nacho364 (5.5 +/- 0pA, n=1) orion359 (10.88 +/- 0pA, n=1) mEPSC amplitude (pA)

minis with decay time constant >9ms