0 2 4 6 8 10 0

5

10

15 orion363_cell1

decay time constant (ms) frequency

0 2 4 6 8 10 0 5 10 15 20 orion363_cell2

decay time constant (ms)

0 2 4 6 8 10 0 5 10 15 20 25 orion363_cell3

decay time constant (ms)

0 2 4 6 8 10 0 2 4 6 8 10 orion363_cell3

decay time constant (ms)